% \file{style/mu/fithesis-pharm.sty}
% This is the style file for the theses written at the Faculty of
% Pharmacy at the Masaryk University in Brno. It has been prepared
% in accordance with the formal requirements.
%    \begin{macrocode}
\NeedsTeXFormat{LaTeX2e}
\ProvidesPackage{fithesis/style/mu/fithesis-mu-pharm}[2018/06/11]
%    \end{macrocode}
% The file defines the color scheme of the respective faculty. Note
% the the color definitions are in RGB, which makes the resulting
% files generally unsuitable for printing.
%    \begin{macrocode}
\thesis@color@setup{
  links={HTML}{F58E76},
  tableEmph={HTML}{FF9D85},
  tableOdd={HTML}{FFF5F6},
  tableEven={HTML}{FFDEDF}}
%    \end{macrocode}
% The bibliography support is enabled. The |authoryear| citations
% are used and the bibliography is sorted by name, title, and year.
%    \begin{macrocode}
\thesis@bibliography@setup{
  style=iso-authoryear,
  sorting=nty}
\thesis@bibliography@load
%    \end{macrocode}
% The file loads the following packages:
% \begin{itemize}
%   \item\textsf{tikz} -- Used for dimension arithmetic.
%   \item\textsf{geometry} -- Allows for modifications of the type
%     area dimensions.
%   \item\textsf{setspace} -- Used for setting space.
% \end{itemize}
%    \begin{macrocode}
\thesis@require{tikz}
\thesis@require{geometry}
\thesis@require{setspace}
\geometry{top=25mm,bottom=20mm,left=25mm,right=25mm,includeheadfoot}

%    \end{macrocode}
% Enable the inclusion of the scanned assignment inside the digital
% version of the document.
%    \begin{macrocode}
\thesis@blocks@assignment@hideIfDigital@false
%    \end{macrocode}
% \begin{macro}{\thesis@blocks@frontMatter}
% The |\thesis@blocks@frontMatter| macro sets up the style
% of the front matter of the thesis. The page numbering is roman
% in accordance with the formal requirements of the faculty.
% \begin{macrocode}
\def\thesis@blocks@frontMatter{%
\thesis@blocks@clear
  \newgeometry{top=25mm, bottom=20mm, left=35mm, right=15mm, includeheadfoot}
  \pagestyle{empty}
  \parindent 1.5em
  \setcounter{page}{1}
  \pagenumbering{roman}}
%    \end{macrocode}
% \end{macro}\begin{macro}{\thesis@blocks@mainMatter}
% The |\thesis@blocks@mainMatter| macro sets up the style
% of the main matter of the thesis. The page numbering doesn't
% reset at the beginning of the main thesis in accordance with the
% formal requirements of the faculty.
% \begin{macrocode}
\def\thesis@blocks@mainMatter{%
  \thesis@blocks@clear
  \newgeometry{top=25mm,bottom=20mm,left=35mm,
    right=15mm, includeheadfoot}
  \setcounter{page}{1}
  \pagenumbering{arabic}
  \pagestyle{thesisheadings}
  \parindent 1.5em
  \onehalfspacing}
%    \end{macrocode}
% \end{macro}
% Note that there is no direct support for the seminar paper and
% thesis proposal types.  If you would like to change the contents
% of the preamble and the postamble, you should modify the
% |\thesis@blocks@preamble| and |\thesis@blocks@postamble| macros.
%
% All blocks within the autolayout preamble that are not defined
% within this file are defined in the
% \texttt{style/mu/fithesis-base.sty} file.
%    \begin{macrocode}
\def\thesis@blocks@preamble{%
  \thesis@blocks@coverMatter
    \thesis@blocks@cover
    \thesis@blocks@titlePage
  \thesis@blocks@frontMatter
    \thesis@blocks@seal
    \thesis@blocks@bibEntry
    \thesis@blocks@abstract
    \thesis@blocks@bibEntryEn
    \thesis@blocks@abstractEn
    \thesis@blocks@assignment
    \thesis@blocks@declaration
    \thesis@blocks@thanks
    \thesis@blocks@tables}
%    \end{macrocode}
% All blocks within the autolayout postamble that are not defined
% within this file are defined in the
% \texttt{style/mu/fithesis-base.sty} file.
%    \begin{macrocode}
\def\thesis@blocks@postamble{%
  \thesis@blocks@bibliography}
%    \end{macrocode}
